\documentclass[letterpaper,english]{article}
\nonstopmode
\akai
\usepackage{linuxdoc-sgml}
\usepackage{qwertz}
\usepackage{url}
\usepackage[latin1]{inputenc}
\usepackage{t1enc}
\usepackage[english]{babel}
\usepackage{epsfig}
\usepackage{null}
\def\addbibtoc{
\addcontentsline{toc}{section}{\numberline{\mbox{}}\relax\bibname}
}%end-preamble
\setcounter{page}{1}
\title{3D Accelerated With ATI HOWTO}
\author{Author: ATI {\ttfamily www.ati.com}\\ 
 \\ Ä¶ªÌ: ³¯±Ó¼C  {\ttfamily expns@yahoo.com}}
\date{Â½Ä¶¤é´Á: 2002¦~11¤ë9¤é, 2002¦~11¤ë23¤é²Ä¤G¦¸§ó·s reversion 0.17 }
\abstract{¦¹¤åÀÉ¬°§A´£¨Ñ¤@­Ó¦b Linux §@·~¨t²Î¤W³]©w ATI 3D¥[³t¥dªº°Ñ¦Ò.}


\begin{document}
\maketitle
\tableofcontents

\section{Án©ú}

¦pªG±Ä¥Î¤F¦¹¤åÀÉ·í¤¤ªº¤èªk¦Ó¾É­P§Aªº¥ô¦ó¹k¥¢(µwÅé·lÃa,¨ç¦¡®w²V¶Ãµ¥),
§@ªÌµLÅv©Ó¾á¥ô¦ó³d¥ô.

¦b¶}©l³]©w¤§«eºò°O:
\begin{itemize}
\item §A¤£¤@©w«D±o«ö¦¹¤åÀÉ¨Ó³]©w.
\item §A¤£¥²¹ï¦¹¤åÀÉ³ø¥H¤Ó¤jªº´Á±æ.
\item ¤@¤Á¥H "Just for fun" ¬°­ì«h. 
\item §A³Ì¦n¯à¼ô±x XF86Config-4 ªº³]©w, ¦]¬°¦³50\%ªº°ÝÃD³£¥X¦Û³o­Ó³]©wÀÉ,
¯S§O¬O¹CÀ¸¹B¦æ®ÉÅã¥Ü¼Ò¦¡ªºÅÜ´«©M¨ä¥¦ªº¥\¯à(3D¥[³t)¥Ñ XFree86 ¨M©w, §A¥i¥H¦b

\onlynameurl{www.tldp.org} §ä¨ì¶i¤@¨Bªº¸ê°T.
\item ¥Ñ©ó·sÂÂª©¥»¤§¶¡ªº®t§O¾É¦Ü¤F³\¦h¤£¥²­nªº®É¶¡®ö¶O¦b¸Ñ¨M¬Û®e¬G»Ù¤W,
§Ú­Ì±j¯P±ÀÂË§A¨Ï¥Î³Ì·sªº Mandrake ©M Red Hat  
\end{itemize}



\subsection{ª©Åv}

Copyright (C) 2002, by ATI 

This document is free; you can redistribute it and/or modify it under the terms of the 
GNU General Public License as published by the Free Software Foundation; 
either version 2 of the License, or (at your option) any later version. 

This document is distributed in the hope that it will be useful,
but WITHOUT ANY WARRANTY; without even the implied warranty of MERCHANTABILITY or 
FITNESS FOR A PARTICULAR PURPOSE. See the GNU General Public License for more details. 
You can get a copy of the GNU GPL 
\onlynameurl{here}




\section{Àô¹Ò}


\subsection{µwÅéÀô¹Ò}

§A¦Ü¤Ö¦³¤@¶ô ATI ¨t¦C3D¥[³t¥d©M¤ä«ù¥¦ªº¥ÀªO,¤U­±¬O¤@³¡¥÷ Linux ¤ä«ùªº ATI ¨t¦C3D¥[³t¥d:
\begin{tscreen}
\par
\addvspace{\medskipamount}
\nopagebreak\hrule
\begin{verbatim}

All IN WONDER 9700 PRO     ¨t¦C  ( AGP 8X )

RADEON 9700 PRO  ¨t¦C            ( AGP 8X )
 
RADEON 9500 PRO  ¨t¦C

8700/8800        ¨t¦C


ALL IN WONDER RADEON 8500  ¨t¦C
\end{verbatim} 
\nopagebreak\hrule 
\addvspace{\medskipamount}
\end{tscreen}




¹ê»Ú¤WÁÙ¦³¤@¨Ç "ÅJ" ¥d¬O³QLinux¤ä«ùªº, ¥H¤W¥u¦C¥X¤F¦³¥Nªí©Êªº¤@³¡¥÷.


\subsection{³nÅéÀô¹Ò}

\begin{itemize}
\item ª©¥»¬° 2.4.10 ¥H¤Wªº®Ö¤ß. 
\item XFree86ª©¥»¬°4.2.0©Î§ó·s.
\item libc 6.2 (=glibc 2.2) 
\end{itemize}



\section{¤U¸üÅX°Êµ{¦¡}

\onlynameurl{http://pdownload.mii.instacontent.net/ati/drivers/fglrx-glc22-4.2.0-2.4.3.i586.rpm}

³o­ÓÅX°Êµ{¦¡¤w¸g¥i¥H°w¹ï AGP 8X ¶i¦æ¤ä´©. 


\section{¦w¸Ë}


\subsection{¦w¸Ë rpm ³nÅé¥]}

\begin{tscreen}
\par
\addvspace{\medskipamount}
\nopagebreak\hrule
\begin{verbatim}
rpm -i --force fglrx-glc22-4.2.0-2.4.3.i586.rpm
\end{verbatim} 
\nopagebreak\hrule 
\addvspace{\medskipamount}
\end{tscreen}


¦pªG§Aªº¨t²Î¸Ì¨S¦³ QT2.x.x  ½Ð¥ý¦w¸ËQT2.x.x  (½Ðª`·N x ¬O¥Nªí0¦Ü9ªº¼Æ¦r).

¹ï©ó Debian µo¦æª©, §A¥i¥H¨Ï¥Î alien ¤u¨ã±N rpm Âà´«¦¨ deb,
µM«á¦w¸Ë:
\begin{tscreen}
\par
\addvspace{\medskipamount}
\nopagebreak\hrule
\begin{verbatim}
dpkg -i --force-overwrite fglrx-glc22-4.2.0-2.4.3.i586.deb 
\end{verbatim} 
\nopagebreak\hrule 
\addvspace{\medskipamount}
\end{tscreen}





\subsection{¦w¸ËÅX°Ê¼Ò²Õ}

 ¦pªG§A½sÄ¶¹L®Ö¤ß (¥¿¦b¨Ï¥Îªº¤£¬Oµo¦æª©Àq»{ªº±Ò°Ê®Ö¤ß) ³o³¡¥÷§A¥i¯à­n­«·s½sÄ¶¥¦, 
¨Ã¨Ï¥Î·s®Ö¤ß±Ò°ÊµM«á°õ¦æ¦p¤U¨BÆJ. ¦pªG§Aªº CPU ¨ã³Æ ISSE ®Ä¯à (¦p ­^¥Nº¸ Pentium III ), 
½Ð¦b³]©w®Ö¤ß®É±N ISSE ®Ä¯à¥]§t¶i¥h. 

¶i¤J§Aªº®Ö¤ß·½¥N½X¥Ø¿ý (¦p/usr/src/linux)
\begin{tscreen}
\par
\addvspace{\medskipamount}
\nopagebreak\hrule
\begin{verbatim}

°õ¦æ«ü¥O make distclean

°õ¦æ«ü¥O make dep
\end{verbatim} 
\nopagebreak\hrule 
\addvspace{\medskipamount}
\end{tscreen}




¶i¤J /lib/module/fglrx/build\_mod ¥Ø¿ý

\begin{tscreen}
\par
\addvspace{\medskipamount}
\nopagebreak\hrule
\begin{verbatim}

°õ¦æ«ü¥O ./make.sh
\end{verbatim} 
\nopagebreak\hrule 
\addvspace{\medskipamount}
\end{tscreen}




¶i¤J /lib/module/fglrx ¥Ø¿ý

\begin{tscreen}
\par
\addvspace{\medskipamount}
\nopagebreak\hrule
\begin{verbatim}

°õ¦æ«ü¥O ./make_install.sh
\end{verbatim} 
\nopagebreak\hrule 
\addvspace{\medskipamount}
\end{tscreen}





\section{XF86Config ³]©wÀÉ}

½Ð¨Ï¥Î fglrxconfig µ{¦¡¨Ó³]©w XF86Config ³]©wÀÉ.

\begin{tscreen}
\par
\addvspace{\medskipamount}
\nopagebreak\hrule
\begin{verbatim}

°õ¦æ«ü¥O fglrxconfig
\end{verbatim} 
\nopagebreak\hrule 
\addvspace{\medskipamount}
\end{tscreen}




¥¦ªº³]©w­·®æ©M xfconfig ¬Û¹³.




\subsection{³]©wÁä½L©M·Æ¹«}

¦³¤T­Ó¶µ¥Ø:
\begin{tscreen}
\begin{verbatim}
=============================================================================
 Mouse and keyboard
=============================================================================
1. serial port mice

2. PS/2 port mice

3. Bus mice
§A¥i¥H¿ï¨ú¬ÛÀ³ªº¶µ¥Ø, ¦b¦¹¨Ò¤¤§Ú­Ì¿ï¨ú 2
±µ¤U¨Ó¿ï¨úÃþ«¬. µM«á¬O³]³Æ¦WºÙ, Àq»{¬° /dev/mouse
§¹¦¨¤§«á´N¬OÁä½LÃþ«¬ªº¿ï©w.
\end{verbatim}
\end{tscreen}





\subsection{³]©w¼ü¹õ}

\begin{tscreen}
\begin{verbatim}
=============================================================================
Fire GL Screen Management
=============================================================================
1. Default    [single screen]

2. Clone mode [2screens same content]

3. Big mode   [2screens one framebuffer]

4. Dual Head  [2screens twodrivers]
§A¥i¥H¿ï¨ú¬ÛÀ³ªº¶µ¥Ø, ¦b¦¹¨Ò¤¤§Ú­Ì¿ï¨ú 4
±µ¤U¨Ó¿ï¨ú¼ü¹õ¦ì¸m. ¦b¦¹¨Ò¤¤§Ú­Ì¿ï¨ú 3
\end{verbatim}
\end{tscreen}





\subsection{¨ä¥¦}

¨ä¥¦ªº¨Ì¾Ú§Aªº¹ê»Ú±¡ªp¦Ó©w.
¥H¤U¬O¤@¥÷§¹¾ãªº XF86Config ³]©wÀÉ

\begin{tscreen}
\begin{verbatim}
# File generated by fglrxconfig (C) ATI Research, a substitute for xf86config.

# Note by ATI: the below copyright notice is there for servicing possibly
# pending third party rights on the file format and the instance of this file.
#
# Copyright (c) 1999 by The XFree86 Project, Inc.
#
# Permission is hereby granted, free of charge, to any person obtaining a
# copy of this software and associated documentation files (the "Software"),
# to deal in the Software without restriction, including without limitation
# the rights to use, copy, modify, merge, publish, distribute, sublicense,
# and/or sell copies of the Software, and to permit persons to whom the
# Software is furnished to do so, subject to the following conditions:
# 
# The above copyright notice and this permission notice shall be included in
# all copies or substantial portions of the Software.
# 
# THE SOFTWARE IS PROVIDED "AS IS", WITHOUT WARRANTY OF ANY KIND, EXPRESS OR
# IMPLIED, INCLUDING BUT NOT LIMITED TO THE WARRANTIES OF MERCHANTABILITY,
# FITNESS FOR A PARTICULAR PURPOSE AND NONINFRINGEMENT.  IN NO EVENT SHALL
# THE XFREE86 PROJECT BE LIABLE FOR ANY CLAIM, DAMAGES OR OTHER LIABILITY,
# WHETHER IN AN ACTION OF CONTRACT, TORT OR OTHERWISE, ARISING FROM, OUT OF
# OR IN CONNECTION WITH THE SOFTWARE OR THE USE OR OTHER DEALINGS IN THE
# SOFTWARE.
# 
# Except as contained in this notice, the name of the XFree86 Project shall
# not be used in advertising or otherwise to promote the sale, use or other
# dealings in this Software without prior written authorization from the
# XFree86 Project.
#

# **********************************************************************
# Refer to the XF86Config(4/5) man page for details about the format of 
# this file.
# **********************************************************************

# **********************************************************************
# DRI Section
# **********************************************************************
Section "dri"
# Access to OpenGL ICD is allowed for all users:
    Mode 0666
# Access to OpenGL ICD is restricted to a specific user group:
#    Group 100    # users
#    Mode 0660
EndSection

# **********************************************************************
# Module section -- this  section  is used to specify
# which dynamically loadable modules to load.
# **********************************************************************
#
Section "Module"

# This loads the DBE extension module.

    Load        "dbe"   # Double buffer extension

# This loads the miscellaneous extensions module, and disables
# initialisation of the XFree86-DGA extension within that module.
    SubSection  "extmod"
      Option    "omit xfree86-dga"   # don't initialise the DGA extension
    EndSubSection

# This loads the Type1 and FreeType font modules
    Load        "type1"
    Load        "freetype"

# This loads the GLX module
    Load        "glx"   # libglx.a
    Load        "dri"   # libdri.a

EndSection

# **********************************************************************
# Files section.  This allows default font and rgb paths to be set
# **********************************************************************

Section "Files"

# The location of the RGB database.  Note, this is the name of the
# file minus the extension (like ".txt" or ".db").  There is normally
# no need to change the default.

    RgbPath     "/usr/X11R6/lib/X11/rgb"

# Multiple FontPath entries are allowed (which are concatenated together),
# as well as specifying multiple comma-separated entries in one FontPath
# command (or a combination of both methods)
# 
# If you don't have a floating point coprocessor and emacs, Mosaic or other
# programs take long to start up, try moving the Type1 and Speedo directory
# to the end of this list (or comment them out).
# 

    FontPath   "/usr/X11R6/lib/X11/fonts/local/"
    FontPath   "/usr/X11R6/lib/X11/fonts/misc/"
    FontPath   "/usr/X11R6/lib/X11/fonts/75dpi/:unscaled"
    FontPath   "/usr/X11R6/lib/X11/fonts/100dpi/:unscaled"
    FontPath   "/usr/X11R6/lib/X11/fonts/Type1/"
    FontPath   "/usr/X11R6/lib/X11/fonts/Speedo/"
    FontPath   "/usr/X11R6/lib/X11/fonts/75dpi/"
    FontPath   "/usr/X11R6/lib/X11/fonts/100dpi/"

# The module search path.  The default path is shown here.

#    ModulePath "/usr/X11R6/lib/modules"

EndSection

# **********************************************************************
# Server flags section.
# **********************************************************************

Section "ServerFlags"

# Uncomment this to cause a core dump at the spot where a signal is 
# received.  This may leave the console in an unusable state, but may
# provide a better stack trace in the core dump to aid in debugging

#    Option "NoTrapSignals"

# Uncomment this to disable the <Crtl><Alt><BS> server abort sequence
# This allows clients to receive this key event.

#    Option "DontZap"

# Uncomment this to disable the <Crtl><Alt><KP_+>/<KP_-> mode switching
# sequences.  This allows clients to receive these key events.

#    Option "Dont Zoom"

# Uncomment this to disable tuning with the xvidtune client. With
# it the client can still run and fetch card and monitor attributes,
# but it will not be allowed to change them. If it tries it will
# receive a protocol error.

#    Option "DisableVidModeExtension"

# Uncomment this to enable the use of a non-local xvidtune client. 

#    Option "AllowNonLocalXvidtune"

# Uncomment this to disable dynamically modifying the input device
# (mouse and keyboard) settings. 

#    Option "DisableModInDev"

# Uncomment this to enable the use of a non-local client to
# change the keyboard or mouse settings (currently only xset).

#    Option "AllowNonLocalModInDev"

EndSection

# **********************************************************************
# Input devices
# **********************************************************************

# **********************************************************************
# Core keyboard's InputDevice section
# **********************************************************************

Section "InputDevice"

    Identifier  "Keyboard1"
    Driver      "Keyboard"
# For most OSs the protocol can be omitted (it defaults to "Standard").
# When using XQUEUE (only for SVR3 and SVR4, but not Solaris),
# uncomment the following line.

#    Option "Protocol"   "Xqueue"

    Option "AutoRepeat" "500 30"

# Specify which keyboard LEDs can be user-controlled (eg, with xset(1))
#    Option "Xleds"      "1 2 3"

#    Option "LeftAlt"    "Meta"
#    Option "RightAlt"   "ModeShift"

# To customise the XKB settings to suit your keyboard, modify the
# lines below (which are the defaults).  For example, for a non-U.S.
# keyboard, you will probably want to use:
#    Option "XkbModel"   "pc102"
# If you have a US Microsoft Natural keyboard, you can use:
#    Option "XkbModel"   "microsoft"
#
# Then to change the language, change the Layout setting.
# For example, a german layout can be obtained with:
#    Option "XkbLayout"  "de"
# or:
#    Option "XkbLayout"  "de"
#    Option "XkbVariant" "nodeadkeys"
#
# If you'd like to switch the positions of your capslock and
# control keys, use:
#    Option "XkbOptions" "ctrl:swapcaps"

# These are the default XKB settings for XFree86
#    Option "XkbRules"   "xfree86"
#    Option "XkbModel"   "pc101"
#    Option "XkbLayout"  "us"
#    Option "XkbVariant" ""
#    Option "XkbOptions" ""

#    Option "XkbDisable"

    Option "XkbRules"   "xfree86"
    Option "XkbModel"   "pc101"
    Option "XkbLayout"  "us"

EndSection


# **********************************************************************
# Core Pointer's InputDevice section
# **********************************************************************

Section "InputDevice"

# Identifier and driver

    Identifier  "Mouse1"
    Driver "mouse"
    Option "Protocol"   "PS/2"
    Option "Device"     "/dev/mouse"

# When using XQUEUE, comment out the above two lines, and uncomment
# the following line.

#    Option "Protocol"   "Xqueue"

# Baudrate and SampleRate are only for some Logitech mice. In
# almost every case these lines should be omitted.

#    Option "BaudRate"   "9600"
#    Option "SampleRate" "150"

# Emulate3Buttons is an option for 2-button Microsoft mice
# Emulate3Timeout is the timeout in milliseconds (default is 50ms)

#    Option "Emulate3Buttons"
#    Option "Emulate3Timeout"    "50"

# ChordMiddle is an option for some 3-button Logitech mice

#    Option "ChordMiddle"

EndSection


# **********************************************************************
# Other input device sections 
# this is optional and is required only if you
# are using extended input devices.  This is for example only.  Refer
# to the XF86Config man page for a description of the options.
# **********************************************************************
#
# Section "InputDevice" 
#    Identifier  "Mouse2"
#    Driver      "mouse"
#    Option      "Protocol"      "MouseMan"
#    Option      "Device"        "/dev/mouse2"
# EndSection
#
# Section "InputDevice"
#    Identifier "spaceball"
#    Driver     "magellan"
#    Option     "Device"         "/dev/cua0"
# EndSection
#
# Section "InputDevice"
#    Identifier "spaceball2"
#    Driver     "spaceorb"
#    Option     "Device"         "/dev/cua0"
# EndSection
#
# Section "InputDevice"
#    Identifier "touchscreen0"
#    Driver     "microtouch"
#    Option     "Device"         "/dev/ttyS0"
#    Option     "MinX"           "1412"
#    Option     "MaxX"           "15184"
#    Option     "MinY"           "15372"
#    Option     "MaxY"           "1230"
#    Option     "ScreenNumber"   "0"
#    Option     "ReportingMode"  "Scaled"
#    Option     "ButtonNumber"   "1"
#    Option     "SendCoreEvents"
# EndSection
#
# Section "InputDevice"
#    Identifier "touchscreen1"
#    Driver     "elo2300"
#    Option     "Device"         "/dev/ttyS0"
#    Option     "MinX"           "231"
#    Option     "MaxX"           "3868"
#    Option     "MinY"           "3858"
#    Option     "MaxY"           "272"
#    Option     "ScreenNumber"   "0"
#    Option     "ReportingMode"  "Scaled"
#    Option     "ButtonThreshold"    "17"
#    Option     "ButtonNumber"   "1"
#    Option     "SendCoreEvents"
# EndSection

# **********************************************************************
# Monitor section
# **********************************************************************

# Any number of monitor sections may be present

Section "Monitor"
    Identifier  "Monitor0"
    HorizSync   31.5 - 82.0
    VertRefresh 40-150
EndSection


Section "Monitor"
    Identifier  "Monitor1"
    HorizSync   31.5 - 82.0
    VertRefresh 40-150
EndSection


# **********************************************************************
# Graphics device section
# **********************************************************************

# Any number of graphics device sections may be present

# Standard VGA Device:

Section "Device"
    Identifier  "Standard VGA"
    VendorName  "Unknown"
    BoardName   "Unknown"

# The chipset line is optional in most cases.  It can be used to override
# the driver's chipset detection, and should not normally be specified.

#    Chipset     "generic"

# The Driver line must be present.  When using run-time loadable driver
# modules, this line instructs the server to load the specified driver
# module.  Even when not using loadable driver modules, this line
# indicates which driver should interpret the information in this section.

    Driver      "vga"
# The BusID line is used to specify which of possibly multiple devices
# this section is intended for.  When this line isn't present, a device
# section can only match up with the primary video device.  For PCI
# devices a line like the following could be used.  This line should not
# normally be included unless there is more than one video device
# installed.

#    BusID       "PCI:0:10:0"

#    VideoRam    256

#    Clocks      25.2 28.3

EndSection

# === ATI device section ===

Section "Device"
    Identifier                        "ATI Graphics Adapter jack 0"
    Driver                            "fglrx"
# === disable PnP Monitor  ===
    #Option                            "NoDDC"
# === disable/enable XAA/DRI ===
    Option "no_accel"                 "no"
    Option "no_dri"                   "no"
# === Fire GL DDX driver module specific settings ===
# === Screen Management ===
    Option "DesktopSetup"             "0x00000000" 
    Option "Display2"                 "0" 
    Option "HSync2"                   "(null)" 
    Option "VRefresh2"                "(null)" 
    Option "GammaCorrectionI"         "0x00000000"
    Option "GammaCorrectionII"        "0x00000000"
# === OpenGL specific profiles/settings ===
    Option "Capabilities"             "0x00000000"
# === Video Overlay for the Xv extension ===
    Option "VideoOverlay"             "on"
# === OpenGL Overlay ===
# Note: When OpenGL Overlay is enabled, Video Overlay
#       will be disabled automatically
    Option "OpenGLOverlay"            "off"
#    BusID "PCI:1:0:0"    # no device found at config time
    Screen 0
EndSection

Section "Device"
    Identifier                        "ATI Graphics Adapter jack 1"
    Driver                            "fglrx"
#    BusID "PCI:1:0:0"    # no device found at config time
    Screen 1
EndSection


# **********************************************************************
# Screen sections
# **********************************************************************

# Any number of screen sections may be present.  Each describes
# the configuration of a single screen.  A single specific screen section
# may be specified from the X server command line with the "-screen"
# option.
Section "Screen"
    Identifier  "Screen0"
    Device      "ATI Graphics Adapter jack 0"
    Monitor     "Monitor0"
    DefaultDepth 24
    #Option "backingstore"

    Subsection "Display"
        Depth       24
        Modes       "640x480"
        ViewPort    0 0  # initial origin if mode is smaller than desktop
#        Virtual     1280 1024
    EndSubsection
EndSection

Section "Screen"
    Identifier  "Screen1"
    Device      "ATI Graphics Adapter jack 1"
    Monitor     "Monitor1"
    DefaultDepth 24
    #Option "backingstore"

    Subsection "Display"
        Depth       24
        Modes       "640x480"
        ViewPort    0 0  # initial origin if mode is smaller than desktop
#        Virtual     1280 1024
    EndSubsection
EndSection

# **********************************************************************
# ServerLayout sections.
# **********************************************************************

# Any number of ServerLayout sections may be present.  Each describes
# the way multiple screens are organised.  A specific ServerLayout
# section may be specified from the X server command line with the
# "-layout" option.  In the absence of this, the first section is used.
# When now ServerLayout section is present, the first Screen section
# is used alone.

Section "ServerLayout"

# The Identifier line must be present
    Identifier  "Server Layout"

# Each Screen line specifies a Screen section name, and optionally
# the relative position of other screens.  The four names after
# primary screen name are the screens to the top, bottom, left and right
# of the primary screen.

    Screen "Screen0"
    Screen "Screen1" RightOf  "Screen0"

# Each InputDevice line specifies an InputDevice section name and
# optionally some options to specify the way the device is to be
# used.  Those options include "CorePointer", "CoreKeyboard" and
# "SendCoreEvents".

    InputDevice "Mouse1" "CorePointer"
    InputDevice "Keyboard1" "CoreKeyboard"

EndSection

\end{verbatim}
\end{tscreen}


 ª`·N:
\begin{itemize}
\item  Xinerama ©M DRI ¬O¬Û¤¬±Æ¥¸ªº, Xinerama ¥²»Ý³QÃö³¬.
\item  Video Overlay ©M OpenGL Overlay ¤]¬O¬Û¤¬±Æ¥¸ªº. ¥Ñ fglrxconfig ³]©wªº
XF86Config ³]©wÀÉ¤¤  Video Overlay ¬O³B¦b¶}±Òªºª¬ºA¤§¤¤.
\item  ½Ðª`·N DRI ªº¨Ï¥ÎÅv­­. 
\end{itemize}





\section{Agpgart}

«Ü¦hµo¦æª©³£¥]§t Agpgart ¼Ò²Õ,¥¦±Mªù¥Î¨ÓÃÑ§OAGP³]³Æ. "ÅJ" 
¥dªºÅX°Êµ{¦¡·|©M¥¦¨ó¦P¤u§@, ¨S¦³ 
Agpgart ¼Ò²Õ¤]µLÃöºò­n, ¦]¬° "ÅJ" 
¥dªºÅX°Êµ{¦¡¤w¸g¥]¬A¤F Agpgart ªº®Ä¯à.




\section{ÀËµø}

 ATI ´£¨Ñ¤@­Ó¦W¬° fglrxinfo ªºµ{¦¡, ¥¦¥i¥HÀËµøÅX°Êµ{¦¡ªº¹B¦æ±¡ªp.
¨Ãµo¥X¦p¤U°T®§:
\begin{tscreen}
\begin{verbatim}

OpenGL vendor string: ATI

OpenGL renderer string: FireGL 8700/8800

OpenGL version string: 1.2.1234 (1.2.3)
\end{verbatim}
\end{tscreen}




 ÁÙ¦³¨ä¥¦ªºµ{¦¡¦p xdpyinfo ©M glxinfo ¤]¥i¥H´£¨Ñ¬ÛÀ³ªº®Ä¯à.




\section{ATI Control Panel}

 ¥i¥H³q¹L ATI Control Panel ½Õ¸` Gamma »P Dual Screenµ¥¿ï¶µ.

½Ð¶}±Ò¤@­Ó²×ºÝ
\begin{tscreen}
\par
\addvspace{\medskipamount}
\nopagebreak\hrule
\begin{verbatim}
°õ¦æ fireglcontrol
\end{verbatim} 
\nopagebreak\hrule 
\addvspace{\medskipamount}
\end{tscreen}


Information ´£¨Ñ¤F "ÅJ" ¥dªº¬ÛÃö¸ê°T.



 DualScreen ´£¨Ñ Âù¼ü¹õ ³]©w. ½Ð¥ý¦b "Set Primary 
Monitor" ¤¤¿ï¨ú¤@­Ó¼ü¹õ§@¬°¥D Screen,
µM«á¦b "Desktop Setup" ¤¤¿ï¾Ü¥¦­ÌªºÂ\©ñ¦ì¸m.
\begin{itemize}
\item  Disable Secondary Monitor      ±N²Ä¤G­Ó¼ü¹õÃö±¼.
\item  Clone Mode                     ¨Ï¥¦­ÌÅã¥Ü¬Û¦Pªº¤º®e.
\item  Extended Desktop Horizontal    ±N®à­±¤º®e¾î¦VÂX®i¦Ü²Ä¤G­Ó¼ü¹õ.
\item  Extended Desktop Vertical      ±N®à­±¤º®eÁa¦VÂX®i¦Ü²Ä¤G­Ó¼ü¹õ
\end{itemize}




 Adjustment ´£¨Ñ¬ÛÀ³ªº Gamma ½Õ¸`.

\end{document}
